
\begin{table}[ht]
\centering
\begin{tabular}{lrrr}
\sisetup{detect-weight=true,detect-inline-weight=math}
    \hfill{} & \multicolumn{1}{c}{4 Threads} & \multicolumn{1}{c}{8 Threads} & \multicolumn{1}{c}{16 Threads} \\\hline
    Program & \multicolumn{3}{c}{Execution Time (sec.)} \\\hline
        AdapterRemoval &
        
        \hlcell{102.0} &
        
        
        \hlcell{98.91} &
        
        
        \hlcell{99.71}
        
        \\\        Atropos (insert + nowriter) &
        
        362.12 &
        
        
        173.54 &
        
        
        155.11
        
        \\\        Atropos (insert + worker) &
        
        593.21 &
        
        
        248.34 &
        
        
        145.78
        
        \\\        Atropos (insert + writer) &
        
        399.53 &
        
        
        178.98 &
        
        
        156.22
        
        \\\        SeqPurge &
        
        232.65 &
        
        
        178.67 &
        
        
        140.44
        
        \\\        Skewer &
        
        203.81 &
        
        
        153.39 &
        
        
        129.91
        
        \\\hline
    
    \hfill{} & \multicolumn{3}{c}{CPU Usage (\%)} \\\hline
    
        AdapterRemoval &
        
        287 &
        
        
        268 &
        
        
        269
        
        \\\    
        Atropos (insert + nowriter) &
        
        340 &
        
        
        744 &
        
        
        862
        
        \\\    
        Atropos (insert + worker) &
        
        326 &
        
        
        709 &
        
        
        1183
        
        \\\    
        Atropos (insert + writer) &
        
        290 &
        
        
        738 &
        
        
        820
        
        \\\    
        SeqPurge &
        
        272 &
        
        
        371 &
        
        
        453
        
        \\\    
        Skewer &
        
        365 &
        
        
        630 &
        
        
        712
        
        \\\    
\end{tabular}
\caption{Min/max execution time and average CPU usage for trimming of mRNA-Seq data on a cluster node with 4, 8, or 16 parallel threads.\label{tab:real-performance-rnaseq}}
\end{table}
